/*
 * @Author: your name
 * @Date: 2021-11-25 10:07:57
 * @LastEditTime: 2021-11-25 10:19:33
 * @LastEditors: Please set LastEditors
 * @Description: 打开koroFileHeader查看配置 进行设置: https://github.com/OBKoro1/koro1FileHeader/wiki/%E9%85%8D%E7%BD%AE
 * @FilePath: /MedicalWisdomCheckSys/src/components/iframePage/index.tsx
 */


const IframePage = ({url}: {url: string})=>{
    
    return (
        <>
            {
                url&&(
                    <iframe  id="reportFrame" src={`${url}`} width="100%" height="800px" />
                )
            }
        </>
    )

}

export default IframePage;