/*
 * @Author: your name
 * @Date: 2022-02-15 17:00:30
 * @LastEditTime: 2022-02-15 17:00:31
 * @LastEditors: Please set LastEditors
 * @Description: 打开koroFileHeader查看配置 进行设置: https://github.com/OBKoro1/koro1FileHeader/wiki/%E9%85%8D%E7%BD%AE
 * @FilePath: /MedicalQualificationMana/src/global.tsx
 */
