/*
 * @Author: your name
 * @Date: 2022-01-06 15:07:59
 * @LastEditTime: 2022-01-06 15:09:45
 * @LastEditors: Please set LastEditors
 * @Description: 打开koroFileHeader查看配置 进行设置: https://github.com/OBKoro1/koro1FileHeader/wiki/%E9%85%8D%E7%BD%AE
 * @FilePath: /KC-MiddlePlatform/src/pages/platform/index.tsx
 */

/*
 * @Author: your name
 * @Date: 2021-11-10 09:33:30
 * @LastEditTime: 2022-01-06 14:15:37
 * @LastEditors: Please set LastEditors
 * @Description: 打开koroFileHeader查看配置 进行设置: https://github.com/OBKoro1/koro1FileHeader/wiki/%E9%85%8D%E7%BD%AE
 * @FilePath: /KC-MiddlePlatform/src/pages/index.tsx
 */

import { useState, useEffect } from 'react';
import { useModel, history } from 'umi';

const IndexPage = () => {
  return (
    <div className="indexPage">
      PLATFORM
      {/* <TopBar
        openedTabs={openedTabs ? openedTabs : []}
        onTabChange={(data) => {
          onCurrentSystemChanged(data);
        }}
        sysList={selectableSysList}
        currentTab={currentOpenedTab}
        userPannelTabClick={(tag) => userPannelTabClick(tag)}
      /> */}
      {/* <MicroApp name='MedicalWisdomCheckSys' /> */}
      {/* {openedTabs && (
        <IframePage activedItem={currentOpenedTab} list={openedTabs} onload={onIframePageLoad} />
      )} */}
    </div>
  );
};

export default IndexPage;
