import { PageLoading } from '@ant-design/pro-layout';
import { notification,Modal,message } from 'antd';
import { history, Link ,useModel} from 'umi';
import RightContent from '@/components/RightContent';
import Footer from '@/components/Footer';
import { currentUser as queryCurrentUser,outLogin } from './services/ant-design-pro/api';
import { BookOutlined, LinkOutlined } from '@ant-design/icons';
import {getQueryString} from './utils';
import { stringify } from 'querystring';
import {getSubHosp} from './services/user';


const defaultMenus = [
  {
    path: '/',
    name: 'welcome',
    icon: 'smile',
    children: [
      {
        path: '/welcome',
        name: 'one',
        icon: 'smile',
        children: [
          {
            path: '/welcome/welcome',
            name: 'two',
            icon: 'smile',
            exact: true,
          },
        ],
      },
    ],
  },
  {
    path: '/responsibilityCenter',
    name: 'demo',
    icon: 'heart',
  },
];


const isDev = process.env.NODE_ENV === 'development';
const loginPath = '/user/login';

let requestMethod = 'get';

/** 获取用户信息比较慢的时候会展示一个 loading */

export const initialStateConfig = {
  loading: <PageLoading />,
};
/**
 * @see  https://umijs.org/zh-CN/plugins/plugin-initial-state
 * */

export async function getInitialState() {
  const fetchUserInfo = async () => {
    const userData = localStorage.getItem('userData');
    if(userData){
      return JSON.parse(userData);
    }
    return undefined;
  }; // 如果是登录页面，不执行

  //医院标识
  const sign = getQueryString('hospSign');

  const fetchSubHosp = async ()=>{
    // try {
    //   const msg = await getSubHosp(sign);
    // } catch (error) {
      
    // }
  }

  if (history.location.pathname !== loginPath) {
    const currentUser = await fetchUserInfo();
    return {
      fetchUserInfo,
      currentUser,
      settings: {},
      isExpired:false,
      fetchSubHosp,
      sign
    };
  }

  return {
    fetchUserInfo,
    settings: {},
    fetchSubHosp,
    sign
  };
}


/**
 * 退出登录，并且将当前的 url 保存
 */
 const loginOut = async () => {
  // await outLogin();
  const { query = {}, pathname } = history.location;
  const { redirect,hospSign } = query; // Note: There may be security issues, please note
  const loginParams = localStorage.getItem('loginParams');

  let sign;
  if(loginParams){
      const {hospSign,hospId} = JSON.parse(loginParams);
      sign = hospSign;
  }
  // &hospSign=${sign}
  // console.log({redirect,hospSign})
  if (window.location.pathname !== `/user/login` && !redirect) {
    history.replace({
      pathname: `/user/login`,
      search: stringify({
        redirect: pathname,
        hospSign:sign
      }),
    });
  }
};

/**
 * 异常处理程序
    200: '服务器成功返回请求的数据。',
    201: '新建或修改数据成功。',
    202: '一个请求已经进入后台排队（异步任务）。',
    204: '删除数据成功。',
    400: '发出的请求有错误，服务器没有进行新建或修改数据的操作。',
    401: '用户没有权限（令牌、用户名、密码错误）。',
    403: '用户得到授权，但是访问是被禁止的。',
    404: '发出的请求针对的是不存在的记录，服务器没有进行操作。',
    405: '请求方法不被允许。',
    406: '请求的格式不可得。',
    410: '请求的资源被永久删除，且不会再得到的。',
    422: '当创建一个对象时，发生一个验证错误。',
    500: '服务器发生错误，请检查服务器。',
    502: '网关错误。',
    503: '服务不可用，服务器暂时过载或维护。',
    504: '网关超时。',
 //-----English
    200: The server successfully returned the requested data. ',
    201: New or modified data is successful. ',
    202: A request has entered the background queue (asynchronous task). ',
    204: Data deleted successfully. ',
    400: 'There was an error in the request sent, and the server did not create or modify data. ',
    401: The user does not have permission (token, username, password error). ',
    403: The user is authorized, but access is forbidden. ',
    404: The request sent was for a record that did not exist. ',
    405: The request method is not allowed. ',
    406: The requested format is not available. ',
    410':
        'The requested resource is permanently deleted and will no longer be available. ',
    422: When creating an object, a validation error occurred. ',
    500: An error occurred on the server, please check the server. ',
    502: Gateway error. ',
    503: The service is unavailable. ',
    504: The gateway timed out. ',
 * @see cd 
 */

//请求拦截器
const authHeaderInterceptor = (url, options) => {
  console.log({options});
  const {method} = options;
  if(method == 'post'){
    requestMethod='post'
  }else{
    requestMethod='get'
  }
  const userData = localStorage.getItem('userData');
  let authHeader = {};
  if(userData){
    const {token} = JSON.parse(userData);
    authHeader.token = token;
  }

  return {
    url: `${url}`,
    options: { ...options, interceptors: true, headers: authHeader },
  };
};




//响应拦截器
const demoResponseInterceptors = async (response, options) => {
  // response.headers.append('interceptors', 'yes yo');
  // console.log({response});

  const {status} = response;

  if(status != 200){
        if(status == 500){
          notification.error({
            message: '抱歉，服务器出现错误！'
          });
        }
        if(status == 404){
          notification.error({
            message: '抱歉，服务器未找到请求！'
          });
        }

        return {};
  }

  const _response = await response.clone().json();
  const {status:dataStatus,msg,errorMessage,errorCode} = _response;
  
  //success返回
  if(dataStatus == 200){
    if(requestMethod=='post'&&history.location.pathname != loginPath){
      message.success('操作成功！');
    }
    return response;
  }else{

    if(errorCode==499){
      // setInitialState((s) => ({ ...s, isExpired:true}));
      Modal.confirm({
        title:'抱歉，登录已过期请重新登录！',
        onOk:()=>{
          loginOut();
        }
      });
    }else{
      notification.error({
        message:errorMessage,
        duration: 5,
      });
    }
    return {}
  }
}


export const request = {
  errorHandler: (error) => {
    console.log({error});
    const { response } = error;
    if (!response) {
      notification.error({
        description: '您的网络发生异常，无法连接服务器',
        message: '网络异常',
      });
    }

    

    throw error;
  },
  // 新增自动添加AccessToken的请求前拦截器
  requestInterceptors: [authHeaderInterceptor],
  responseInterceptors: [demoResponseInterceptors],
}; // ProLayout 支持的api https://procomponents.ant.design/components/layout

export const layout = ({ initialState }) => {
  return {
    rightContentRender: () => <RightContent />,
    disableContentMargin: false,
    waterMarkProps: {
      content:'',
    },
    footerRender: () => <Footer />,
    onPageChange: () => {
      const { location } = history; // 如果没有登录，重定向到 login

      if (!initialState?.currentUser && location.pathname !== loginPath) {
        history.push(loginPath);
      }
    },
    // menu: {
    //   // 每当 initialState?.currentUser?.userid 发生修改时重新执行 request
    //   // params: {
    //   //   userId: initialState?.currentUser?.userid,
    //   // },
    //   request: async (params, defaultMenuData) => {
    //     // initialState.currentUser 中包含了所有用户信息
    //     // const menuData = await fetchMenuData();
    //     // return menuData;
    //     return defaultMenus;
    //   },
    // },
    links: isDev
      ? [
          <Link to="/umi/plugin/openapi" target="_blank">
            <LinkOutlined />
            <span>OpenAPI 文档</span>
          </Link>,
          <Link to="/~docs">
            <BookOutlined />
            <span>业务组件文档</span>
          </Link>,
        ]
      : [],
    menuHeaderRender: undefined,
    // 自定义 403 页面
    // unAccessible: <div>unAccessible</div>,
    ...initialState?.settings,
  };
};
